Summary Page Created:Sat September 30, 2006 08:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290207

Instrument: HRC Obs ID: 2651 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02651N002 full img2.fits hrcf02651N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 08:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290207

Instrument: HRC Obs ID: 2651 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:36:32 Date and time of file creation DATE-OBS 2002-08-09T13:45:22 Observation start date DATE-END 2002-08-09T14:10:31 Observation end date RA PNT 332.19892871559 Pointing RA DEC PNT 45.703282030552 Pointing Dec ROLL PNT 165.91485420636 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:42:30 Date and time of file creation DATE-OBS 2002-08-09T13:45:22 Observation start date DATE-END 2002-08-09T14:10:31 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2651 Observation id SEQ NUM 290207 Sequence number RA NOM 332.19892871559 Nominal RA DEC NOM 45.703282030552 Nominal Dec ROLL NOM 165.91485420636 Nominal Roll

Summary Page Created:Sat September 30, 2006 08:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290207

Instrument: HRC Obs ID: 2651 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169914 45.742302 1127.857178 36.559849 30.849613 332.628543 45.651459 257.707153 41.697529 6.180394 332.619846 45.625764 275.080353 45.493851 6.046539 332.630269 45.669801 211.133041 38.803822 5.441037 332.611524 45.607086 226.008041 42.417076 5.328232 331.872194 45.799265 134.333328 28.480627 4.716656 331.873039 45.806841 94.875000 21.658169 4.380564 332.591127 45.680597 141.227966 34.062687 4.146120 331.901816 45.751916 121.325584 31.025822 3.910471 332.370823 45.717608 40.909092 10.533991 3.883532