Summary Page Created:Wed February 22, 2006 17:02 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290513

Instrument: HRC Obs ID: 6021 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06021N002 full img2.fits hrcf06021N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:02 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290513

Instrument: HRC Obs ID: 6021 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:18:11 Date and time of file creation DATE-OBS 2005-02-10T10:38:01 Observation start date DATE-END 2005-02-10T11:49:06 Observation end date RA PNT 332.17681074031 Pointing RA DEC PNT 45.741501880876 Pointing Dec ROLL PNT 351.07962718325 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:01:03 Date and time of file creation DATE-OBS 2005-02-10T10:38:01 Observation start date DATE-END 2005-02-10T11:49:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6021 Observation id SEQ NUM 290513 Sequence number RA NOM 332.17681074031 Nominal RA DEC NOM 45.741501880876 Nominal Dec ROLL NOM 351.07962718325 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:02 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290513

Instrument: HRC Obs ID: 6021 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169970 45.742321 14794.250000 128.932983 114.743713 331.735672 45.742449 228.781250 27.837492 8.218457 331.753147 45.837022 204.137497 29.122543 7.009604 331.743152 45.779378 198.510712 34.051563 5.829709 331.826615 45.833480 145.420685 24.949215 5.828668 331.752224 45.817995 180.787506 34.074734 5.305617 331.781486 45.838687 147.708328 29.304636 5.040442 332.528097 45.728045 114.458336 24.929491 4.591282 331.819748 45.834303 116.778229 25.654940 4.551881 332.521504 45.697014 101.500000 25.685240 3.951686