Summary Page Created:Sat February 25, 2006 05:11 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590398

Instrument: ACIS Obs ID: 6071 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

acisf06071N002 full img2.fits acisf06071N002 cntr img2.fits

Summary Page Created:Sat February 25, 2006 05:11 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590398

Instrument: ACIS Obs ID: 6071 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T08:51:12 Date and time of file creation DATE-OBS 2005-02-26T09:09:56 Observation start date DATE-END 2005-02-26T12:21:58 Observation end date RA PNT 278.39277549858 Pointing RA DEC PNT -10.54802473601 Pointing Dec ROLL PNT 86.157267470805 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T10:10:23 Date and time of file creation DATE-OBS 2005-02-26T09:09:56 Observation start date DATE-END 2005-02-26T12:21:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT G21.5-09[S3,-120,-1.0,0,0] Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6071 Observation id SEQ NUM 590398 Sequence number RA NOM 278.39277549858 Nominal RA DEC NOM -10.54802473601 Nominal Dec ROLL NOM 86.157267470805 Nominal Roll

Summary Page Created:Sat February 25, 2006 05:11 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590398

Instrument: ACIS Obs ID: 6071 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389964 -10.568811 769.428589 55.600574 13.838500 278.367947 -10.402417 136.909088 14.706281 9.309566 278.352744 -10.240307 186.209305 29.144152 6.389251 278.347414 -10.277432 160.829544 27.228674 5.906624 278.477201 -10.247718 162.119598 27.661175 5.860908 278.350083 -10.258921 166.742859 30.427889 5.479935 278.365763 -10.590065 47.142857 9.021741 5.225472 278.475378 -10.274531 149.625000 29.415043 5.086683 278.446103 -10.247072 160.790695 31.941185 5.033961 278.474857 -10.285744 146.416672 29.547865 4.955236