Summary Page Created:Thu June 1, 2006 13:45 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600407

Instrument: ACIS Obs ID: 4752 Source: M81 X-9 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04752N004 full img2.fits acisf04752N004 cntr img2.fits

Summary Page Created:Thu June 1, 2006 13:45 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600407

Instrument: ACIS Obs ID: 4752 Source: M81 X-9 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-01T16:30:51 Date and time of file creation DATE-OBS 2004-03-25T10:03:54 Observation start date DATE-END 2004-03-25T12:01:26 Observation end date RA PNT 149.45224805336 Pointing RA DEC PNT 69.058539951938 Pointing Dec ROLL PNT 216.79563365847 Pointing Roll RA TARG 149.47625 Observer’s specified target RA DEC TARG 69.062889 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-01T17:42:47 Date and time of file creation DATE-OBS 2004-03-25T10:03:54 Observation start date DATE-END 2004-03-25T12:01:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M81 X-9 Obs 2 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4752 Observation id SEQ NUM 600407 Sequence number RA NOM 149.45224805336 Nominal RA DEC NOM 69.058539951938 Nominal Dec ROLL NOM 216.79563365847 Nominal Roll

Summary Page Created:Thu June 1, 2006 13:45 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600407

Instrument: ACIS Obs ID: 4752 Source: M81 X-9 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 149.472127 69.063387 1629.142822 44.517967 36.595177 149.699622 69.092313 100.875000 12.267966 8.222634 148.730967 68.893386 148.704315 24.672249 6.027189 148.856118 69.167502 76.176468 12.917560 5.897126 148.831302 68.854896 104.954468 22.592796 4.645483 149.364044 69.226767 35.048275 8.423043 4.160999 148.850032 69.167688 49.708332 12.235503 4.062631 148.818328 68.855578 99.182724 25.198257 3.936095 148.803444 68.865546 88.445534 26.004442 3.401170 148.845131 68.930053 58.862068 18.946980 3.106673