Summary Page Created:Thu March 23, 2006 10:12 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290494

Instrument: HRC Obs ID: 6002 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06002N002 full img2.fits hrcf06002N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:12 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290494

Instrument: HRC Obs ID: 6002 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:45:59 Date and time of file creation DATE-OBS 2005-09-01T22:28:28 Observation start date DATE-END 2005-09-01T22:53:38 Observation end date RA PNT 332.15387130035 Pointing RA DEC PNT 45.7751649977 Pointing Dec ROLL PNT 190.93103982756 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:11:02 Date and time of file creation DATE-OBS 2005-09-01T22:28:28 Observation start date DATE-END 2005-09-01T22:53:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6002 Observation id SEQ NUM 290494 Sequence number RA NOM 332.15387130035 Nominal RA DEC NOM 45.7751649977 Nominal Dec ROLL NOM 190.93103982756 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:12 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290494

Instrument: HRC Obs ID: 6002 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170238 45.742452 4610.306641 72.802742 63.326004 332.593597 45.807153 194.019638 31.215708 6.215449 332.568976 45.875772 124.528572 26.837791 4.640046 331.796564 45.774553 75.375000 17.612638 4.279597 331.808703 45.735233 102.875000 24.220415 4.247450 331.802939 45.756934 97.791664 23.051313 4.242347 332.595307 45.787900 111.777679 26.927376 4.151080 332.584432 45.838719 131.929459 32.375038 4.075037 332.577348 45.851530 140.839279 34.576443 4.073273 332.524572 45.872733 95.966431 24.261877 3.955441