Summary Page Created:Wed February 22, 2006 17:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290524

Instrument: HRC Obs ID: 6032 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06032N002 full img2.fits hrcf06032N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290524

Instrument: HRC Obs ID: 6032 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T21:42:01 Date and time of file creation DATE-OBS 2005-02-10T16:00:46 Observation start date DATE-END 2005-02-10T16:25:56 Observation end date RA PNT 332.03401310906 Pointing RA DEC PNT 45.755534721984 Pointing Dec ROLL PNT 351.49682905216 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-22T22:22:23 Date and time of file creation DATE-OBS 2005-02-10T16:00:46 Observation start date DATE-END 2005-02-10T16:25:56 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6032 Observation id SEQ NUM 290524 Sequence number RA NOM 332.03401310906 Nominal RA DEC NOM 45.755534721984 Nominal Dec ROLL NOM 351.49682905216 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290524

Instrument: HRC Obs ID: 6032 Source: ArLac PI: Dr. CXC Calibration Title: AO6A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169999 45.742326 6991.284180 87.420807 79.972771 331.610433 45.844658 92.349106 19.434422 4.751832 331.599994 45.793630 90.622322 21.694155 4.177269 331.592136 45.754507 72.210716 18.594633 3.883417 331.614727 45.750408 66.625000 18.506411 3.600104 331.599574 45.774464 77.314285 22.532562 3.431225 331.630604 45.749556 64.291664 18.932619 3.395815 331.637952 45.847337 59.125000 19.029285 3.107053