Summary Page Created:Mon February 27, 2006 10:11 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590400

Instrument: HRC Obs ID: 6073 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

hrcf06073N002 full img2.fitshrcf06073N002 cntr img2.fits

Summary Page Created:Mon February 27, 2006 10:11 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590400

Instrument: HRC Obs ID: 6073 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-27T13:19:42 Date and time of file creation DATE-OBS 2005-03-18T03:07:59 Observation start date DATE-END 2005-03-18T09:21:16 Observation end date RA PNT 278.38966167402 Pointing RA DEC PNT -10.563773834788 Pointing Dec ROLL PNT 91.041086838377 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 Processing system revision DATE 2006-02-27T15:09:13 Date and time of file creation DATE-OBS 2005-03-18T03:07:59 Observation start date DATE-END 2005-03-18T09:21:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT G21.5-09 Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6073 Observation id SEQ NUM 590400 Sequence number RA NOM 278.38966167402 Nominal RA DEC NOM -10.563773834788 Nominal Dec ROLL NOM 91.041086838377 Nominal Roll

Summary Page Created:Mon February 27, 2006 10:11 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590400

Instrument: HRC Obs ID: 6073 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.344625 -10.871152 1290.032104 71.853363 17.953678 278.440826 -10.865541 1376.849976 81.548920 16.883730 278.369600 -10.871353 948.306274 80.801903 11.736188 278.429286 -10.318764 654.583313 56.899017 11.504300 278.442129 -10.850999 905.375000 78.846336 11.482779 278.389345 -10.870677 923.942871 80.926315 11.417088 278.342737 -10.845009 885.250000 80.067200 11.056337 278.442377 -10.832595 723.661560 70.394135 10.280140 278.340250 -10.827644 648.563049 63.933220 10.144382 278.442230 -10.839107 769.041687 77.403847 9.935445