Summary Page Created:Thu October 12, 2006 12:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800205

Instrument: ACIS Obs ID: 3205 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETAILED STUDY OF CLUSTER A907

acisf03205N003 full img2.fits acisf03205N003 cntr img2.fits

Summary Page Created:Thu October 12, 2006 12:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800205

Instrument: ACIS Obs ID: 3205 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETAILED STUDY OF CLUSTER A907

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-12T16:02:34 Date and time of file creation DATE-OBS 2002-10-30T00:45:46 Observation start date DATE-END 2002-10-30T14:21:55 Observation end date RA PNT 149.53028506925 Pointing RA DEC PNT -11.082912853067 Pointing Dec ROLL PNT 80.421995085105 Pointing Roll RA TARG 149.592083 Observer’s specified target RA DEC TARG -11.063889 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-12T16:31:15 Date and time of file creation DATE-OBS 2002-10-30T00:45:46 Observation start date DATE-END 2002-10-30T14:21:55 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A907 Source name TITLE DETAILED STUDY OF CLUS- TER A907

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 3205 Observation id SEQ NUM 800205 Sequence number RA NOM 149.53028506925 Nominal RA DEC NOM -11.082912853067 Nominal Dec ROLL NOM 80.421995085105 Nominal Roll

Summary Page Created:Thu October 12, 2006 12:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800205

Instrument: ACIS Obs ID: 3205 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETAILED STUDY OF CLUSTER A907

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 149.672741 -11.073685 615.693176 28.073391 21.931557 149.567297 -11.077414 158.428574 14.137460 11.206297 149.617580 -10.952356 128.154999 14.445603 8.871557 149.520330 -11.100070 88.142860 11.281209 7.813246 149.521195 -10.936355 100.590912 12.991619 7.742754 149.489121 -11.192194 97.103447 12.622784 7.692712 149.491809 -11.123245 82.556816 11.037564 7.479623 149.620302 -11.044963 92.147728 13.180924 6.990991 149.249042 -10.985594 236.981247 35.120659 6.747632 149.449651 -11.013235 74.667503 11.689330 6.387663