Summary Page Created:Thu March 23, 2006 10:14 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290497

Instrument: HRC Obs ID: 6005 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06005N002 full img2.fits hrcf06005N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 10:14 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290497

Instrument: HRC Obs ID: 6005 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T14:49:37 Date and time of file creation DATE-OBS 2005-09-01T23:43:58 Observation start date DATE-END 2005-09-02T00:09:08 Observation end date RA PNT 332.21860152928 Pointing RA DEC PNT 45.715400453237 Pointing Dec ROLL PNT 190.91870538548 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:12:47 Date and time of file creation DATE-OBS 2005-09-01T23:43:58 Observation start date DATE-END 2005-09-02T00:09:08 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6005 Observation id SEQ NUM 290497 Sequence number RA NOM 332.21860152928 Nominal RA DEC NOM 45.715400453237 Nominal Dec ROLL NOM 190.91870538548 Nominal Roll

Summary Page Created:Thu March 23, 2006 10:14 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290497

Instrument: HRC Obs ID: 6005 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169956 45.742350 4697.000000 72.146080 65.104019 332.633490 45.816079 118.124107 21.514868 5.490348 332.659158 45.727571 123.314285 23.588774 5.227668 331.867578 45.693062 84.666664 18.961691 4.465143 332.650534 45.759972 108.860718 26.983112 4.034402 331.929710 45.624472 58.095745 16.321228 3.559520 332.604598 45.813401 80.166664 23.382221 3.428531 331.860381 45.714563 49.250000 15.257396 3.227943 332.659078 45.740740 76.255356 23.999836 3.177328 332.634252 45.792428 91.549110 28.863356 3.171811