Summary Page Created:Sat November 24, 2007 12:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290479

Instrument: HRC Obs ID: 5987 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05987N003 full img2.fits hrcf05987N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 12:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290479

Instrument: HRC Obs ID: 5987 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:04:25 Date and time of file creation DATE-OBS 2005-09-27T12:22:06 Observation start date DATE-END 2005-09-27T12:47:16 Observation end date RA PNT 332.15994444978 Pointing RA DEC PNT 45.693909801478 Pointing Dec ROLL PNT 221.88136686583 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T17:14:05 Date and time of file creation DATE-OBS 2005-09-27T12:22:06 Observation start date DATE-END 2005-09-27T12:47:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5987 Observation id SEQ NUM 290479 Sequence number RA NOM 332.15994444978 Nominal RA DEC NOM 45.693909801478 Nominal Dec ROLL NOM 221.88136686583 Nominal Roll

Summary Page Created:Sat November 24, 2007 12:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290479

Instrument: HRC Obs ID: 5987 Source: ArLac PI: Dr. CXC Calibration Title: AO6 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169998 45.742331 1042.083374 34.178398 30.489531 331.971245 45.539168 47.300892 13.163184 3.593423 332.430572 45.442011 82.481728 24.017807 3.434191 332.499720 45.482790 85.182724 24.903097 3.420568 331.801757 45.564506 62.625000 18.389797 3.405421 332.025543 45.480608 49.588234 14.618649 3.392122 332.462735 45.821003 56.583332 16.681166 3.392049 331.955874 45.956825 58.878571 17.505327 3.363466 331.926786 45.957012 62.542858 18.980936 3.295035 331.799931 45.503332 71.308968 21.830261 3.266519