Summary Page Created:Fri April 7, 2006 04:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590404

Instrument: ACIS Obs ID: 6077 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06077N002 full img2.fits acisf06077N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 04:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590404

Instrument: ACIS Obs ID: 6077 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T07:38:13 Date and time of file creation DATE-OBS 2004-12-19T13:28:34 Observation start date DATE-END 2004-12-19T15:50:24 Observation end date RA PNT 15.537452452008 Pointing RA DEC PNT -71.71079423033 Pointing Dec ROLL PNT 294.25670041125 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T08:03:58 Date and time of file creation DATE-OBS 2004-12-19T13:28:34 Observation start date DATE-END 2004-12-19T15:50:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S0,-120,21.44,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6077 Observation id SEQ NUM 590404 Sequence number RA NOM 15.537452452008 Nominal RA DEC NOM -71.71079423033 Nominal Dec ROLL NOM 294.25670041125 Nominal Roll

Summary Page Created:Fri April 7, 2006 04:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590404

Instrument: ACIS Obs ID: 6077 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.527855 -71.687810 370.571442 20.897549 17.732771 16.106959 -71.959014 213.132889 29.662949 7.185155 15.753344 -72.011084 137.591370 28.047243 4.905700 15.700674 -71.977831 123.500000 27.146259 4.549430 15.716784 -71.989028 105.416664 26.877567 3.922106 16.096134 -71.945049 106.248215 27.452780 3.870217 15.735025 -71.998416 104.912498 28.297029 3.707545 15.874334 -71.998254 106.312294 29.762413 3.572032 16.043876 -71.971840 106.548172 30.158924 3.532890 16.066159 -71.929000 101.208336 28.929373 3.498463