Summary Page Created:Thu March 23, 2006 11:57 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290510

Instrument: HRC Obs ID: 6018 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf06018N002 full img2.fits hrcf06018N002 cntr img2.fits

Summary Page Created:Thu March 23, 2006 11:57 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290510

Instrument: HRC Obs ID: 6018 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T15:24:48 Date and time of file creation DATE-OBS 2005-09-02T05:11:08 Observation start date DATE-END 2005-09-02T05:36:18 Observation end date RA PNT 332.40650470824 Pointing RA DEC PNT 45.73970878653 Pointing Dec ROLL PNT 190.93901053863 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-23T16:55:36 Date and time of file creation DATE-OBS 2005-09-02T05:11:08 Observation start date DATE-END 2005-09-02T05:36:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6018 Observation id SEQ NUM 290510 Sequence number RA NOM 332.40650470824 Nominal RA DEC NOM 45.73970878653 Nominal Dec ROLL NOM 190.93901053863 Nominal Roll

Summary Page Created:Thu March 23, 2006 11:57 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290510

Instrument: HRC Obs ID: 6018 Source: ArLac PI: Dr. CXC Calibration Title: AO6B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169682 45.742261 2741.958740 58.743961 46.676434 332.847600 45.746704 94.068748 20.813486 4.519606 332.827556 45.840347 88.598213 19.806696 4.473145 332.813115 45.840785 102.646431 23.644569 4.341226 332.846909 45.770533 86.982140 22.213015 3.915819 332.060108 45.741906 53.058823 15.570642 3.407620 332.838695 45.791050 74.314285 22.461777 3.308478 332.197268 45.736262 24.795454 7.940438 3.122681 332.088895 45.645435 50.725491 16.583778 3.058741