Summary Page Created:Tue February 28, 2006 16:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590395

Instrument: ACIS Obs ID: 6068 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

acisf06068N002 full img2.fits acisf06068N002 cntr img2.fits

Summary Page Created:Tue February 28, 2006 16:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590395

Instrument: ACIS Obs ID: 6068 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T20:42:44 Date and time of file creation DATE-OBS 2005-04-12T08:43:52 Observation start date DATE-END 2005-04-12T09:47:26 Observation end date RA PNT 350.91726245588 Pointing RA DEC PNT 58.836118735903 Pointing Dec ROLL PNT 37.08655551242 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T21:03:07 Date and time of file creation DATE-OBS 2005-04-12T08:43:52 Observation start date DATE-END 2005-04-12T09:47:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT Cas A[S3,-120,-2.0,0,0] Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6068 Observation id SEQ NUM 590395 Sequence number RA NOM 350.91726245588 Nominal RA DEC NOM 58.836118735903 Nominal Dec ROLL NOM 37.08655551242 Nominal Roll

Summary Page Created:Tue February 28, 2006 16:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590395

Instrument: ACIS Obs ID: 6068 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.866414 58.811798 113.285713 12.892590 8.786886 350.870322 58.828730 159.285721 21.174246 7.522616 350.881440 58.796242 158.571426 24.044252 6.594983 350.853305 58.840733 176.142853 27.286688 6.455267 350.886197 58.796707 177.285721 27.875931 6.359813 350.857594 58.834432 133.571426 22.522179 5.930662 350.837020 58.841306 150.857147 26.441483 5.705321 350.851641 58.786955 115.454544 20.619528 5.599282 350.826211 58.817721 97.397728 17.565397 5.544863 350.891809 58.832346 106.857140 19.647686 5.438663