Summary Page Created:Tue November 20, 2007 20:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590012

Instrument: HRC Obs ID: 144 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

hrcf00144N005 full img2.fits hrcf00144N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 20:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590012

Instrument: HRC Obs ID: 144 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T01:07:09 Date and time of file creation DATE-OBS 2000-09-01T00:13:35 Observation start date DATE-END 2000-09-01T08:58:35 Observation end date RA PNT 278.38757642566 Pointing RA DEC PNT -10.572481776435 Pointing Dec ROLL PNT 266.2642947201 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T01:42:52 Date and time of file creation DATE-OBS 2000-09-01T00:13:35 Observation start date DATE-END 2000-09-01T08:58:35 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-0.9 [HRC-I, Offsets=0,0,0] Source name TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 144 Observation id SEQ NUM 590012 Sequence number RA NOM 278.38757642566 Nominal RA DEC NOM -10.572481776435 Nominal Dec ROLL NOM 266.2642947201 Nominal Roll

Summary Page Created:Tue November 20, 2007 20:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590012

Instrument: HRC Obs ID: 144 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389812 -10.568806 277.583344 37.073547 7.487370 278.365676 -10.590096 72.159088 9.951318 7.251210 278.342451 -10.276620 280.388397 45.007542 6.229809 278.292744 -10.835587 249.708328 42.613213 5.859880 278.322298 -10.868275 263.661621 45.820095 5.754279 278.055082 -10.527301 311.735382 55.087517 5.658911 278.120485 -10.467373 227.458328 41.871964 5.432235 278.412610 -10.874360 236.973221 44.172817 5.364685 278.266324 -10.806279 200.560120 37.498169 5.348531 278.701594 -10.546976 243.689285 45.616779 5.342097