Summary Page Created:Mon November 19, 2007 21:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590184

Instrument: HRC Obs ID: 1735 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

hrcf01735N006 full img2.fits hrcf01735N006 cntr img2.fits

Summary Page Created:Mon November 19, 2007 21:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590184

Instrument: HRC Obs ID: 1735 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T01:48:17 Date and time of file creation DATE-OBS 2000-06-21T21:04:22 Observation start date DATE-END 2000-06-21T23:58:00 Observation end date RA PNT 85.035042905981 Pointing RA DEC PNT -69.3298902768 Pointing Dec ROLL PNT 174.57393922306 Pointing Roll RA TARG 85.04625 Observer’s specified target RA DEC TARG -69.332 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T02:11:28 Date and time of file creation DATE-OBS 2000-06-21T21:04:22 Observation start date DATE-END 2000-06-21T23:58:00 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT PSR B0540-69 Source name TITLE VERIFICATION OF AXAF TIM- ING CAPABILITY

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1735 Observation id SEQ NUM 590184 Sequence number RA NOM 85.035042905981 Nominal RA DEC NOM -69.3298902768 Nominal Dec ROLL NOM 174.57393922306 Nominal Roll

Summary Page Created:Mon November 19, 2007 21:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590184

Instrument: HRC Obs ID: 1735 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 85.046524 -69.331711 3528.375000 85.858818 41.095081 84.567925 -69.392327 832.703430 33.454681 24.890491 84.453408 -69.174532 548.524109 32.775967 16.735559 85.034582 -69.286772 38.714287 7.964713 4.860726 85.209131 -69.013951 137.617935 30.152443 4.564073 84.906997 -69.656152 127.778587 28.043266 4.556480 85.449000 -69.535238 77.000000 18.243519 4.220677 85.048287 -69.331508 161.916672 39.437859 4.105615 85.199504 -69.004382 110.563828 28.444431 3.887012 85.303414 -69.581628 72.806992 18.880653 3.856169