Summary Page Created:Mon November 19, 2007 21:07 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590185

Instrument: HRC Obs ID: 1736 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

hrcf01736N006 full img2.fits hrcf01736N006 cntr img2.fits

Summary Page Created:Mon November 19, 2007 21:07 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590185

Instrument: HRC Obs ID: 1736 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T01:47:39 Date and time of file creation DATE-OBS 2000-06-21T23:58:00 Observation start date DATE-END 2000-06-22T02:51:16 Observation end date RA PNT 85.034998439467 Pointing RA DEC PNT -69.329847727519 Pointing Dec ROLL PNT 174.45499517697 Pointing Roll RA TARG 85.04625 Observer’s specified target RA DEC TARG -69.332 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T02:06:27 Date and time of file creation DATE-OBS 2000-06-21T23:58:00 Observation start date DATE-END 2000-06-22T02:51:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT PSR B0540-69 Source name TITLE VERIFICATION OF AXAF TIM- ING CAPABILITY

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1736 Observation id SEQ NUM 590185 Sequence number RA NOM 85.034998439467 Nominal RA DEC NOM -69.329847727519 Nominal Dec ROLL NOM 174.45499517697 Nominal Roll

Summary Page Created:Mon November 19, 2007 21:07 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590185

Instrument: HRC Obs ID: 1736 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 85.046759 -69.331676 3042.833252 80.243576 37.919960 84.567902 -69.392268 620.558594 29.243431 21.220446 84.453168 -69.174493 215.634476 21.337608 10.105841 85.034571 -69.286822 46.000000 8.196392 5.612226 84.760777 -69.095867 64.400002 14.830921 4.342279 85.271759 -69.406326 35.055172 8.569101 4.090881 85.048259 -69.331480 156.375000 38.370331 4.075415 84.111033 -69.283339 66.587105 19.368994 3.437819 85.381218 -69.557750 46.372414 13.834875 3.351849 84.943514 -69.525962 41.162498 12.476693 3.299151