Summary Page Created:Tue November 20, 2007 08:07 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590190

Instrument: HRC Obs ID: 1741 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

hrcf01741N005 full img2.fits hrcf01741N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 08:07 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590190

Instrument: HRC Obs ID: 1741 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T12:50:57 Date and time of file creation DATE-OBS 2000-06-22T02:51:16 Observation start date DATE-END 2000-06-22T05:44:33 Observation end date RA PNT 85.035295359054 Pointing RA DEC PNT -69.329893859089 Pointing Dec ROLL PNT 174.33738655916 Pointing Roll RA TARG 85.04625 Observer’s specified target RA DEC TARG -69.332 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:06:34 Date and time of file creation DATE-OBS 2000-06-22T02:51:16 Observation start date DATE-END 2000-06-22T05:44:33 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT PSR B0540-69 Source name TITLE VERIFICATION OF AXAF TIM- ING CAPABILITY

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1741 Observation id SEQ NUM 590190 Sequence number RA NOM 85.035295359054 Nominal RA DEC NOM -69.329893859089 Nominal Dec ROLL NOM 174.33738655916 Nominal Roll

Summary Page Created:Tue November 20, 2007 08:07 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590190

Instrument: HRC Obs ID: 1741 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 85.046647 -69.331707 3551.291748 86.321007 41.140526 84.568296 -69.392309 854.903442 34.685867 24.647024 84.453412 -69.174263 520.586182 32.619640 15.959288 85.034450 -69.286831 39.714287 8.036937 4.941470 85.374455 -69.086745 101.123077 24.011801 4.211391 84.718760 -69.577192 89.121681 21.251394 4.193686 85.142913 -69.624473 96.978569 24.031975 4.035398 85.048440 -69.331500 137.791672 34.903408 3.947800 85.721491 -69.224165 72.865837 18.952311 3.844694 85.376866 -69.078915 91.916664 23.932693 3.840632