Summary Page Created:Sun May 27, 2007 04:14 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590191

Instrument: HRC Obs ID: 1742 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

hrcf01742N005 full img2.fits hrcf01742N005 cntr img2.fits

Summary Page Created:Sun May 27, 2007 04:14 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590191

Instrument: HRC Obs ID: 1742 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 Processing system revision DATE 2007-05-27T06:54:02 Date and time of file creation DATE-OBS 2000-06-22T13:45:41 Observation start date DATE-END 2000-06-22T13:59:10 Observation end date RA PNT 85.042539415296 Pointing RA DEC PNT -69.332532737624 Pointing Dec ROLL PNT 174.06312984077 Pointing Roll RA TARG 85.04625 Observer’s specified target RA DEC TARG -69.332 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 Processing system revision DATE 2007-05-27T08:12:49 Date and time of file creation DATE-OBS 2000-06-22T13:45:41 Observation start date DATE-END 2000-06-22T13:59:10 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT PSR B0540-69 Source name TITLE VERIFICATION OF AXAF TIM- ING CAPABILITY

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1742 Observation id SEQ NUM 590191 Sequence number RA NOM 85.042539415296 Nominal RA DEC NOM -69.332532737624 Nominal Dec ROLL NOM 174.06312984077 Nominal Roll

Summary Page Created:Sun May 27, 2007 04:14 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590191

Instrument: HRC Obs ID: 1742 Source: PSR B0540-69 PI: Dr. CXC Calibration Title: VERIFICATION OF AXAF TIMING CAPABILITY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 85.046948 -69.331660 141.500000 17.840565 7.931363 85.888804 -69.412252 33.691963 10.486384 3.212925 84.146719 -69.274656 45.644520 14.669428 3.111540