Summary Page Created:Tue November 18, 2008 13:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590197

Instrument: ACIS Obs ID: 1771 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,-3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01771N004 full img2.fits acisf01771N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 13:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590197

Instrument: ACIS Obs ID: 1771 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,-3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T17:57:58 Date and time of file creation DATE-OBS 2000-07-05T05:58:10 Observation start date DATE-END 2000-07-05T08:12:40 Observation end date RA PNT 278.36960480332 Pointing RA DEC PNT -10.575939084291 Pointing Dec ROLL PNT 205.69267609794 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T18:21:05 Date and time of file creation DATE-OBS 2000-07-05T05:58:10 Observation start date DATE-END 2000-07-05T08:12:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,-3]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1771 Observation id SEQ NUM 590197 Sequence number RA NOM 278.36960480332 Nominal RA DEC NOM -10.575939084291 Nominal Dec ROLL NOM 205.69267609794 Nominal Roll

Summary Page Created:Tue November 18, 2008 13:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590197

Instrument: ACIS Obs ID: 1771 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,-3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389676 -10.568604 674.571411 49.070518 13.746980 278.365632 -10.589974 151.857147 14.162639 10.722376 278.367870 -10.402410 91.227585 13.921922 6.552802 278.249686 -10.487767 43.477272 8.707767 4.992931 278.387424 -10.562563 31.428572 9.277528 3.387602 278.147152 -10.444555 30.117241 9.453723 3.185755 278.388383 -10.315893 33.386364 10.712717 3.116517