Summary Page Created:Thu November 20, 2008 18:18 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590198

Instrument: ACIS Obs ID: 1772 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-7,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01772N005 full img2.fits acisf01772N005 cntr img2.fits

Summary Page Created:Thu November 20, 2008 18:18 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590198

Instrument: ACIS Obs ID: 1772 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-7,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T23:00:49 Date and time of file creation DATE-OBS 2000-07-05T14:56:21 Observation start date DATE-END 2000-07-05T17:30:09 Observation end date RA PNT 278.27920664508 Pointing RA DEC PNT -10.622598373756 Pointing Dec ROLL PNT 207.56930029058 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T23:16:33 Date and time of file creation DATE-OBS 2000-07-05T14:56:21 Observation start date DATE-END 2000-07-05T17:30:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I1, T=110, Offsets=-7,0,-1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1772 Observation id SEQ NUM 590198 Sequence number RA NOM 278.27920664508 Nominal RA DEC NOM -10.622598373756 Nominal Dec ROLL NOM 207.56930029058 Nominal Roll

Summary Page Created:Thu November 20, 2008 18:18 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590198

Instrument: ACIS Obs ID: 1772 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-7,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.390196 -10.568992 2087.386230 76.510437 27.282373 278.390272 -10.567654 800.170471 76.078110 10.517749 278.391152 -10.569406 764.170471 76.874176 9.940535 278.365817 -10.590055 73.500000 11.359867 6.470146 278.389363 -10.565990 295.620697 54.050735 5.469318 278.390346 -10.573102 197.965515 45.129486 4.386611 278.250998 -10.608674 29.000000 6.885837 4.211543 278.510232 -10.850053 116.128326 32.952412 3.524122 278.407228 -10.910024 85.348839 26.024960 3.279499 278.230157 -10.887351 33.227272 10.511923 3.160913