Summary Page Created:Tue November 18, 2008 14:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590199

Instrument: ACIS Obs ID: 1773 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-5,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01773N004 full img2.fits acisf01773N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 14:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590199

Instrument: ACIS Obs ID: 1773 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-5,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T18:00:27 Date and time of file creation DATE-OBS 2000-07-05T17:30:09 Observation start date DATE-END 2000-07-05T19:44:39 Observation end date RA PNT 278.30196698826 Pointing RA DEC PNT -10.611546311939 Pointing Dec ROLL PNT 207.87174266115 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T19:42:17 Date and time of file creation DATE-OBS 2000-07-05T17:30:09 Observation start date DATE-END 2000-07-05T19:44:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I1, T=110, Offsets=-5,0,-1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1773 Observation id SEQ NUM 590199 Sequence number RA NOM 278.30196698826 Nominal RA DEC NOM -10.611546311939 Nominal Dec ROLL NOM 207.87174266115 Nominal Roll

Summary Page Created:Tue November 18, 2008 14:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590199

Instrument: ACIS Obs ID: 1773 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-5,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389812 -10.568899 2099.852295 66.372437 31.637413 278.365830 -10.590133 106.857140 12.316549 8.675900 278.389533 -10.564988 166.090912 36.199562 4.588202 278.485128 -10.757281 70.549019 18.423662 3.829262 278.389591 -10.549095 29.770000 9.130850 3.260375 278.390392 -10.573626 102.511360 31.611790 3.242821 278.429962 -10.868919 83.041664 25.788864 3.220059 278.539477 -10.839456 91.371674 28.729023 3.180466 278.455693 -10.769634 47.109634 15.303241 3.078409 278.266400 -10.872554 36.420456 12.016370 3.030903