Summary Page Created:Tue November 18, 2008 13:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590200

Instrument: ACIS Obs ID: 1774 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-4,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01774N004 full img2.fits acisf01774N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 13:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590200

Instrument: ACIS Obs ID: 1774 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-4,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T17:51:07 Date and time of file creation DATE-OBS 2000-07-05T19:44:39 Observation start date DATE-END 2000-07-05T21:59:10 Observation end date RA PNT 278.32461024614 Pointing RA DEC PNT -10.600209981021 Pointing Dec ROLL PNT 208.12099345849 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T18:11:28 Date and time of file creation DATE-OBS 2000-07-05T19:44:39 Observation start date DATE-END 2000-07-05T21:59:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I1, T=110, Offsets=-4,0,-1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1774 Observation id SEQ NUM 590200 Sequence number RA NOM 278.32461024614 Nominal RA DEC NOM -10.600209981021 Nominal Dec ROLL NOM 208.12099345849 Nominal Roll

Summary Page Created:Tue November 18, 2008 13:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590200

Instrument: ACIS Obs ID: 1774 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-4,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.390075 -10.568979 1525.285767 61.054760 24.982256 278.365845 -10.590103 125.714287 12.659969 9.930062 278.251065 -10.608775 34.000000 7.300402 4.657278 278.557960 -10.817433 130.362122 28.038248 4.649439 278.385742 -10.570180 94.571426 24.015394 3.937950 278.317652 -10.495664 27.590000 7.581751 3.639001 278.390274 -10.571732 112.142860 32.033463 3.500803 278.384963 -10.571833 50.727272 14.744118 3.440509 278.512545 -10.876956 106.286568 32.339081 3.286629 278.393484 -10.569545 99.857140 30.842548 3.237643