Summary Page Created:Tue November 18, 2008 20:00 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590201

Instrument: ACIS Obs ID: 1775 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-2,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01775N004 full img2.fits acisf01775N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 20:00 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590201

Instrument: ACIS Obs ID: 1775 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-2,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:21:48 Date and time of file creation DATE-OBS 2000-07-05T21:59:10 Observation start date DATE-END 2000-07-06T00:13:39 Observation end date RA PNT 278.35090342396 Pointing RA DEC PNT -10.586719662612 Pointing Dec ROLL PNT 208.35155611721 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T00:57:57 Date and time of file creation DATE-OBS 2000-07-05T21:59:10 Observation start date DATE-END 2000-07-06T00:13:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I1, T=110, Offsets=-2,0,-1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1775 Observation id SEQ NUM 590201 Sequence number RA NOM 278.35090342396 Nominal RA DEC NOM -10.586719662612 Nominal Dec ROLL NOM 208.35155611721 Nominal Roll

Summary Page Created:Tue November 18, 2008 20:00 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590201

Instrument: ACIS Obs ID: 1775 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-2,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.390078 -10.568926 488.714294 46.497063 10.510649 278.365833 -10.590098 126.714287 12.702878 9.975242 278.587861 -10.808105 125.450798 29.087765 4.312837 278.390084 -10.561047 28.285715 8.442460 3.350411 278.459549 -10.804039 64.000000 19.345646 3.308238 278.588528 -10.820539 103.614365 31.325172 3.307703 278.478019 -10.757598 42.790699 13.207362 3.239913 278.389832 -10.565363 52.428570 16.597189 3.158883 278.431649 -10.780451 38.325581 12.316975 3.111607 278.545438 -10.725210 48.490196 16.131605 3.005913