Summary Page Created:Tue November 18, 2008 19:59 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590203

Instrument: ACIS Obs ID: 1777 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-5,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01777N004 full img2.fits acisf01777N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 19:59 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590203

Instrument: ACIS Obs ID: 1777 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-5,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:21:35 Date and time of file creation DATE-OBS 2000-07-06T02:28:13 Observation start date DATE-END 2000-07-06T04:42:40 Observation end date RA PNT 278.30303335742 Pointing RA DEC PNT -10.613583737937 Pointing Dec ROLL PNT 209.24165637729 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T00:57:26 Date and time of file creation DATE-OBS 2000-07-06T02:28:13 Observation start date DATE-END 2000-07-06T04:42:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I3, T=110, Offsets=-5,0,2]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1777 Observation id SEQ NUM 590203 Sequence number RA NOM 278.30303335742 Nominal RA DEC NOM -10.613583737937 Nominal Dec ROLL NOM 209.24165637729 Nominal Roll

Summary Page Created:Tue November 18, 2008 19:59 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590203

Instrument: ACIS Obs ID: 1777 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-5,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389735 -10.569132 2043.159058 65.122040 31.374311 278.365532 -10.590185 101.318184 11.656826 8.691747 278.388995 -10.565336 196.181824 38.197372 5.136003 278.249643 -10.488117 44.666668 9.295788 4.805044 278.249048 -10.487874 45.113636 9.743277 4.630233 278.385712 -10.570432 115.458336 28.011017 4.121890 278.392987 -10.570033 154.920456 38.761543 3.996757 278.524983 -10.799248 81.083336 22.309540 3.634469 278.345436 -10.900943 38.775002 11.061394 3.505435 278.390579 -10.573227 114.136360 32.746632 3.485438