Summary Page Created:Wed November 19, 2008 11:53 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590206

Instrument: ACIS Obs ID: 1780 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01780N004 full img2.fits acisf01780N004 cntr img2.fits

Summary Page Created:Wed November 19, 2008 11:53 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590206

Instrument: ACIS Obs ID: 1780 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:21:57 Date and time of file creation DATE-OBS 2000-07-05T08:12:40 Observation start date DATE-END 2000-07-05T10:27:09 Observation end date RA PNT 278.4614298576 Pointing RA DEC PNT -10.532877922371 Pointing Dec ROLL PNT 205.65699308244 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:50:48 Date and time of file creation DATE-OBS 2000-07-05T08:12:40 Observation start date DATE-END 2000-07-05T10:27:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip S2, T=110, Offsets=5,0,1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1780 Observation id SEQ NUM 590206 Sequence number RA NOM 278.4614298576 Nominal RA DEC NOM -10.532877922371 Nominal Dec ROLL NOM 205.65699308244 Nominal Roll

Summary Page Created:Wed November 19, 2008 11:53 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590206

Instrument: ACIS Obs ID: 1780 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389767 -10.568927 1334.571411 61.171028 21.817051 278.368340 -10.402491 127.154999 14.408099 8.825244 278.365839 -10.590224 106.462502 13.304364 8.002073 278.381378 -10.271646 68.056816 13.969566 4.871792 278.390240 -10.571640 119.000000 30.255966 3.933109 278.384922 -10.572318 88.333336 23.373274 3.779245 278.505978 -10.464783 23.428572 7.055186 3.320759 278.411358 -10.206194 48.208778 15.271617 3.156756 278.392928 -10.569497 102.285713 32.687309 3.129218