Summary Page Created:Thu November 20, 2008 10:37 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590210

Instrument: ACIS Obs ID: 1784 Source: E0102-72.3 [Chip I3, T=110, Offsets=-4,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01784N004 full img2.fits acisf01784N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 10:37 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590210

Instrument: ACIS Obs ID: 1784 Source: E0102-72.3 [Chip I3, T=110, Offsets=-4,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:04:04 Date and time of file creation DATE-OBS 2000-07-03T08:33:32 Observation start date DATE-END 2000-07-03T10:54:03 Observation end date RA PNT 16.106422735885 Pointing RA DEC PNT -71.954086948479 Pointing Dec ROLL PNT 100.77967516565 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:35:20 Date and time of file creation DATE-OBS 2000-07-03T08:33:32 Observation start date DATE-END 2000-07-03T10:54:03 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip I3, T=110, Offsets=-4,2,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1784 Observation id SEQ NUM 590210 Sequence number RA NOM 16.106422735885 Nominal RA DEC NOM -71.954086948479 Nominal Dec ROLL NOM 100.77967516565 Nominal Roll

Summary Page Created:Thu November 20, 2008 10:37 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590210

Instrument: ACIS Obs ID: 1784 Source: E0102-72.3 [Chip I3, T=110, Offsets=-4,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906560 -72.025961 693.511353 28.128595 24.655031 16.019292 -72.033243 1110.791626 57.673195 19.260103 16.004032 -72.034647 760.083313 60.709621 12.519981 16.013259 -72.035180 633.333313 51.494400 12.299072 15.997469 -72.031208 610.708313 56.445049 10.819520 15.998369 -72.028506 519.333313 50.865440 10.209945 16.000005 -72.028385 480.857147 50.463394 9.528831 16.008288 -72.032595 319.541656 42.320820 7.550460 16.010651 -72.026874 362.571442 48.402485 7.490760 15.998065 -72.033839 404.166656 54.798542 7.375500