Summary Page Created:Thu November 20, 2008 12:06 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590211

Instrument: ACIS Obs ID: 1785 Source: E0102-72.3 [Chip I3, T=110, Offsets=-0,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01785N004 full img2.fits acisf01785N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 12:06 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590211

Instrument: ACIS Obs ID: 1785 Source: E0102-72.3 [Chip I3, T=110, Offsets=-0,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:15:48 Date and time of file creation DATE-OBS 2000-07-03T10:54:03 Observation start date DATE-END 2000-07-03T13:14:33 Observation end date RA PNT 16.14109576993 Pointing RA DEC PNT -72.011459299592 Pointing Dec ROLL PNT 100.69340480459 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T17:04:25 Date and time of file creation DATE-OBS 2000-07-03T10:54:03 Observation start date DATE-END 2000-07-03T13:14:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip I3, T=110, Offsets=-0,2,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1785 Observation id SEQ NUM 590211 Sequence number RA NOM 16.14109576993 Nominal RA DEC NOM -72.011459299592 Nominal Dec ROLL NOM 100.69340480459 Nominal Roll

Summary Page Created:Thu November 20, 2008 12:06 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590211

Instrument: ACIS Obs ID: 1785 Source: E0102-72.3 [Chip I3, T=110, Offsets=-0,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906520 -72.025975 652.428589 28.568695 22.837185 15.807959 -72.153835 250.234482 19.141197 13.073084 15.809265 -72.154386 222.693176 19.407454 11.474622 16.480215 -72.064052 87.034485 11.153407 7.803399 16.016010 -72.034883 189.285721 32.082802 5.899912 16.018769 -72.033288 206.000000 35.278492 5.839252 16.018959 -72.032745 204.428574 35.035912 5.834829 15.212908 -72.163806 152.298538 26.709206 5.702099 15.144536 -72.048584 147.335541 26.094997 5.646122 16.017943 -72.033831 175.714279 34.873074 5.038681