Summary Page Created:Thu November 20, 2008 12:01 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590212

Instrument: ACIS Obs ID: 1786 Source: E0102-72.3 [Chip I1, T=110, Offsets=-7,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01786N004 full img2.fits acisf01786N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 12:01 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590212

Instrument: ACIS Obs ID: 1786 Source: E0102-72.3 [Chip I1, T=110, Offsets=-7,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:13:33 Date and time of file creation DATE-OBS 2000-07-03T13:14:33 Observation start date DATE-END 2000-07-03T15:35:02 Observation end date RA PNT 15.861463710488 Pointing RA DEC PNT -71.917184909401 Pointing Dec ROLL PNT 100.37173751674 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T16:59:32 Date and time of file creation DATE-OBS 2000-07-03T13:14:33 Observation start date DATE-END 2000-07-03T15:35:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip I1, T=110, Offsets=-7,-1,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1786 Observation id SEQ NUM 590212 Sequence number RA NOM 15.861463710488 Nominal RA DEC NOM -71.917184909401 Nominal Dec ROLL NOM 100.37173751674 Nominal Roll

Summary Page Created:Thu November 20, 2008 12:01 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590212

Instrument: ACIS Obs ID: 1786 Source: E0102-72.3 [Chip I1, T=110, Offsets=-7,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906586 -72.025943 674.489990 29.162081 23.129007 16.001084 -72.033912 1660.272705 82.050194 20.234842 16.019872 -72.032741 1432.727295 70.833183 20.226782 16.003422 -72.027787 1169.324097 70.013176 16.701487 14.937639 -72.069192 166.355057 26.784069 6.210970 14.890537 -71.999432 136.890366 27.308382 5.012760 14.909883 -72.032757 136.827240 28.450716 4.809272 15.196499 -72.058961 83.750000 18.813457 4.451601 14.870029 -71.948492 98.405319 24.414858 4.030550 15.068783 -71.936341 72.916664 18.250072 3.995418