Summary Page Created:Thu November 20, 2008 12:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590215

Instrument: ACIS Obs ID: 1789 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,-2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01789N004 full img2.fits acisf01789N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 12:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590215

Instrument: ACIS Obs ID: 1789 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,-2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:24:57 Date and time of file creation DATE-OBS 2000-07-03T03:33:03 Observation start date DATE-END 2000-07-03T05:53:32 Observation end date RA PNT 15.897055469327 Pointing RA DEC PNT -72.017270754571 Pointing Dec ROLL PNT 100.71847545554 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T17:17:52 Date and time of file creation DATE-OBS 2000-07-03T03:33:03 Observation start date DATE-END 2000-07-03T05:53:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S3, T=110, Offsets=-1,-2,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1789 Observation id SEQ NUM 590215 Sequence number RA NOM 15.897055469327 Nominal RA DEC NOM -72.017270754571 Nominal Dec ROLL NOM 100.71847545554 Nominal Roll

Summary Page Created:Thu November 20, 2008 12:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590215

Instrument: ACIS Obs ID: 1789 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,-2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906508 -72.025892 765.285706 30.000671 25.508953 15.807541 -72.153848 294.465912 19.950714 14.759668 16.015808 -72.034722 521.000000 49.261066 10.576303 15.794259 -72.056413 111.238640 12.019983 9.254476 16.008749 -72.032020 280.000000 33.891262 8.261717 16.019256 -72.032824 424.571442 51.798840 8.196544 15.999048 -72.028425 368.571442 45.281441 8.139569 16.020232 -72.031188 326.857147 42.566135 7.678807 16.018346 -72.033629 374.857147 51.273758 7.310896 15.522617 -71.728815 188.794022 26.651268 7.083867