Summary Page Created:Sat May 19, 2007 06:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590062

Instrument: ACIS Obs ID: 194 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO CAS A, JUL. 99

acisf00194N003 full img2.fits acisf00194N003 cntr img2.fits

Summary Page Created:Sat May 19, 2007 06:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590062

Instrument: ACIS Obs ID: 194 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO CAS A, JUL. 99

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-19T10:10:11 Date and time of file creation DATE-OBS 2000-05-19T17:08:16 Observation start date DATE-END 2000-05-19T18:59:11 Observation end date RA PNT 350.95598101999 Pointing RA DEC PNT 58.852757000128 Pointing Dec ROLL PNT 80.130372804465 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-19T10:37:05 Date and time of file creation DATE-OBS 2000-05-19T17:08:16 Observation start date DATE-END 2000-05-19T18:59:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT CAS A [Chip I3, T=120, Offsets=- 2,2,0]

Source name

TITLE ACIS CHIP RESPONSE TO CAS A, JUL. 99

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 194 Observation id SEQ NUM 590062 Sequence number RA NOM 350.95598101999 Nominal RA DEC NOM 58.852757000128 Nominal Dec ROLL NOM 80.130372804465 Nominal Roll

Summary Page Created:Sat May 19, 2007 06:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590062

Instrument: ACIS Obs ID: 194 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO CAS A, JUL. 99

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.887369 58.796566 1201.428589 66.495010 18.067951 350.881224 58.796441 832.428589 47.561924 17.501995 350.848873 58.840059 842.477295 53.512409 15.743587 350.853545 58.840433 641.943176 45.540951 14.095954 350.870286 58.828355 439.590912 32.037827 13.720996 350.797750 58.805826 891.965881 65.674461 13.581626 350.866404 58.811716 282.125000 21.772173 12.958054 350.857768 58.834296 437.204559 35.964729 12.156481 350.913085 58.803297 620.238647 51.288513 12.093130 350.848332 58.805711 401.000000 33.179726 12.085694