Summary Page Created:Sat September 2, 2006 09:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290145

Instrument: HRC Obs ID: 2589 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

hrcf02589N002 full img2.fits hrcf02589N002 cntr img2.fits

Summary Page Created:Sat September 2, 2006 09:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290145

Instrument: HRC Obs ID: 2589 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T12:38:29 Date and time of file creation DATE-OBS 2002-02-19T09:10:39 Observation start date DATE-END 2002-02-19T10:10:29 Observation end date RA PNT 279.23868473323 Pointing RA DEC PNT 38.787662039444 Pointing Dec ROLL PNT 56.651017439046 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T13:10:25 Date and time of file creation DATE-OBS 2002-02-19T09:10:39 Observation start date DATE-END 2002-02-19T10:10:29 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT VEGA Source name TITLE AO3 CALIBRATION OBSERVA- TIONS OF VEGA

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2589 Observation id SEQ NUM 290145 Sequence number RA NOM 279.23868473323 Nominal RA DEC NOM 38.787662039444 Nominal Dec ROLL NOM 56.651017439046 Nominal Roll

Summary Page Created:Sat September 2, 2006 09:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290145

Instrument: HRC Obs ID: 2589 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.234951 38.783834 221.875000 20.942804 10.594331 279.073840 38.512361 181.390182 27.745340 6.537681 278.976014 38.557241 136.722321 27.335581 5.001625 279.025810 38.532219 129.722321 27.200851 4.769054 279.356901 39.015694 94.083336 22.616806 4.159886 279.350453 39.012890 80.549019 21.296307 3.782300 279.087383 38.524537 98.916664 27.249609 3.630022 279.057084 38.523732 117.261604 32.510033 3.606936 279.462638 38.967356 63.500000 18.602600 3.413501 279.060188 38.668696 49.647728 14.637520 3.391813