Summary Page Created:Wed November 21, 2007 13:32 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290177

Instrument: HRC Obs ID: 2621 Source: ARLAC PI: Dr. CXC Calibration Title: AO3 HRC-I CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02621N003 full img2.fits hrcf02621N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 13:32 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290177

Instrument: HRC Obs ID: 2621 Source: ARLAC PI: Dr. CXC Calibration Title: AO3 HRC-I CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T18:23:04 Date and time of file creation DATE-OBS 2002-01-27T06:11:43 Observation start date DATE-END 2002-01-27T06:36:53 Observation end date RA PNT 332.2615188678 Pointing RA DEC PNT 45.712351983982 Pointing Dec ROLL PNT 336.55198144019 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T18:31:20 Date and time of file creation DATE-OBS 2002-01-27T06:11:43 Observation start date DATE-END 2002-01-27T06:36:53 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3 HRC-I CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal tit

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2621 Observation id SEQ NUM 290177 Sequence number RA NOM 332.2615188678 Nominal RA DEC NOM 45.712351983982 Nominal Dec ROLL NOM 336.55198144019 Nominal Roll

Summary Page Created:Wed November 21, 2007 13:32 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290177

Instrument: HRC Obs ID: 2621 Source: ARLAC PI: Dr. CXC Calibration Title: AO3 HRC-I CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170078 45.742338 5892.428711 79.040268 74.549706 331.820273 45.803549 37.166115 11.049110 3.363720 332.156709 45.522668 24.221428 7.746378 3.126807 332.453848 45.999836 35.784054 11.553375 3.097281