Summary Page Created:Mon August 28, 2006 13:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290182

Instrument: HRC Obs ID: 2626 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02626N002 full img2.fits hrcf02626N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 13:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290182

Instrument: HRC Obs ID: 2626 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T17:23:57 Date and time of file creation DATE-OBS 2002-01-26T14:39:21 Observation start date DATE-END 2002-01-26T15:04:31 Observation end date RA PNT 332.04415416291 Pointing RA DEC PNT 45.779783402957 Pointing Dec ROLL PNT 336.31492062037 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T17:49:05 Date and time of file creation DATE-OBS 2002-01-26T14:39:21 Observation start date DATE-END 2002-01-26T15:04:31 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2626 Observation id SEQ NUM 290182 Sequence number RA NOM 332.04415416291 Nominal RA DEC NOM 45.779783402957 Nominal Dec ROLL NOM 336.31492062037 Nominal Roll

Summary Page Created:Mon August 28, 2006 13:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290182

Instrument: HRC Obs ID: 2626 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170107 45.742204 7309.681641 91.075096 80.259941 331.737340 45.871389 67.027924 17.012526 3.939916 331.647144 45.907458 90.227676 24.263767 3.718618 331.628797 45.857767 82.120537 22.326984 3.678085 332.376662 45.704763 63.916668 17.982697 3.554343 331.835377 45.898442 45.056820 13.034289 3.456791 331.786637 45.802873 32.511364 9.545071 3.406090 332.339716 45.636350 34.875000 11.106142 3.140154 332.355418 45.743264 40.019932 12.797230 3.127234