Summary Page Created:Mon August 28, 2006 18:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290185

Instrument: HRC Obs ID: 2629 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02629N002 full img2.fits hrcf02629N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 18:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290185

Instrument: HRC Obs ID: 2629 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T20:50:57 Date and time of file creation DATE-OBS 2002-01-26T15:54:51 Observation start date DATE-END 2002-01-26T16:20:01 Observation end date RA PNT 332.17485374218 Pointing RA DEC PNT 45.73948985236 Pointing Dec ROLL PNT 336.23282506115 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T21:58:46 Date and time of file creation DATE-OBS 2002-01-26T15:54:51 Observation start date DATE-END 2002-01-26T16:20:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2629 Observation id SEQ NUM 290185 Sequence number RA NOM 332.17485374218 Nominal RA DEC NOM 45.73948985236 Nominal Dec ROLL NOM 336.23282506115 Nominal Roll

Summary Page Created:Mon August 28, 2006 18:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290185

Instrument: HRC Obs ID: 2629 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170020 45.742278 5648.375000 80.223564 70.407928 331.778466 45.860154 73.096428 20.319908 3.597281 331.751403 45.818036 56.158928 15.778756 3.559148 331.821373 45.902183 59.541668 18.425217 3.231531 332.397349 45.712796 24.385000 7.730172 3.154522 332.465379 45.706896 36.024109 11.792400 3.054858