Summary Page Created:Mon August 28, 2006 19:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290187

Instrument: HRC Obs ID: 2631 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02631N002 full img2.fits hrcf02631N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 19:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290187

Instrument: HRC Obs ID: 2631 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T22:35:06 Date and time of file creation DATE-OBS 2002-01-26T16:45:11 Observation start date DATE-END 2002-01-26T17:10:21 Observation end date RA PNT 332.21929384578 Pointing RA DEC PNT 45.726018308341 Pointing Dec ROLL PNT 336.22204667604 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T23:07:06 Date and time of file creation DATE-OBS 2002-01-26T16:45:11 Observation start date DATE-END 2002-01-26T17:10:21 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2631 Observation id SEQ NUM 290187 Sequence number RA NOM 332.21929384578 Nominal RA DEC NOM 45.726018308341 Nominal Dec ROLL NOM 336.22204667604 Nominal Roll

Summary Page Created:Mon August 28, 2006 19:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290187

Instrument: HRC Obs ID: 2631 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170010 45.742301 5564.143066 79.974396 69.574051 331.823927 45.859622 69.906250 17.899818 3.905417 332.519420 45.598564 56.541668 14.974553 3.775850 331.848531 45.891937 68.238396 18.535698 3.681458 331.874004 45.883908 67.083336 19.312122 3.473639 331.796477 45.804121 57.574108 16.793686 3.428319 331.842282 45.789893 52.492310 15.996973 3.281390 332.545325 45.638097 48.916668 15.850024 3.086220 331.811714 45.828339 63.677677 21.120195 3.015014 331.816007 45.796372 52.083332 17.358730 3.000412