Summary Page Created:Mon August 28, 2006 21:34 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290192

Instrument: HRC Obs ID: 2636 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02636N002 full img2.fits hrcf02636N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 21:34 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290192

Instrument: HRC Obs ID: 2636 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:09:57 Date and time of file creation DATE-OBS 2002-01-26T18:51:01 Observation start date DATE-END 2002-01-26T19:16:11 Observation end date RA PNT 331.93849879613 Pointing RA DEC PNT 45.776560769985 Pointing Dec ROLL PNT 336.59097183989 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:32:21 Date and time of file creation DATE-OBS 2002-01-26T18:51:01 Observation start date DATE-END 2002-01-26T19:16:11 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2636 Observation id SEQ NUM 290192 Sequence number RA NOM 331.93849879613 Nominal RA DEC NOM 45.776560769985 Nominal Dec ROLL NOM 336.59097183989 Nominal Roll

Summary Page Created:Mon August 28, 2006 21:34 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290192

Instrument: HRC Obs ID: 2636 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170184 45.742413 3392.257568 67.354073 50.364548 332.141283 45.696793 113.930000 20.593225 5.532402 332.152463 45.715449 123.547501 22.730120 5.435409 332.164555 45.733303 109.622498 20.664204 5.304947 331.515365 45.859932 149.635712 28.764795 5.202043 331.532323 45.885537 175.966965 38.175648 4.609404 331.551217 45.922932 143.040176 32.676300 4.377490 331.534392 45.897163 138.673218 34.369804 4.034739 332.161646 45.729114 87.830002 22.274530 3.943069 332.158905 45.725324 90.677498 23.479834 3.861931