Summary Page Created:Mon August 28, 2006 21:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290193

Instrument: HRC Obs ID: 2637 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02637N002 full img2.fits hrcf02637N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 21:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290193

Instrument: HRC Obs ID: 2637 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:16:15 Date and time of file creation DATE-OBS 2002-01-26T19:16:11 Observation start date DATE-END 2002-01-26T19:41:21 Observation end date RA PNT 332.37479932513 Pointing RA DEC PNT 45.643067654407 Pointing Dec ROLL PNT 336.15886553636 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:37:11 Date and time of file creation DATE-OBS 2002-01-26T19:16:11 Observation start date DATE-END 2002-01-26T19:41:21 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2637 Observation id SEQ NUM 290193 Sequence number RA NOM 332.37479932513 Nominal RA DEC NOM 45.643067654407 Nominal Dec ROLL NOM 336.15886553636 Nominal Roll

Summary Page Created:Mon August 28, 2006 21:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290193

Instrument: HRC Obs ID: 2637 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169856 45.742189 5763.496582 83.506241 69.018753 332.169625 45.743132 1123.284058 78.368889 14.333291 331.953228 45.726497 127.262497 21.973862 5.791540 331.979314 45.771502 149.019638 30.454140 4.893248 332.004816 45.808913 91.674110 23.441343 3.910787 332.686644 45.529546 81.250000 22.108494 3.675058 331.995817 45.796640 99.663391 27.875551 3.575298 332.064512 45.689181 51.084442 16.155666 3.162014 332.078760 45.791294 56.799999 18.370668 3.091885 332.699546 45.546798 66.083336 21.949066 3.010758