Summary Page Created:Mon August 28, 2006 23:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290195

Instrument: HRC Obs ID: 2639 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02639N002 full img2.fits hrcf02639N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 23:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290195

Instrument: HRC Obs ID: 2639 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T02:56:54 Date and time of file creation DATE-OBS 2002-01-26T20:06:31 Observation start date DATE-END 2002-01-26T20:31:41 Observation end date RA PNT 332.19541210402 Pointing RA DEC PNT 45.77176553091 Pointing Dec ROLL PNT 336.38957748189 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:21:57 Date and time of file creation DATE-OBS 2002-01-26T20:06:31 Observation start date DATE-END 2002-01-26T20:31:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2639 Observation id SEQ NUM 290195 Sequence number RA NOM 332.19541210402 Nominal RA DEC NOM 45.77176553091 Nominal Dec ROLL NOM 336.38957748189 Nominal Roll

Summary Page Created:Mon August 28, 2006 23:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290195

Instrument: HRC Obs ID: 2639 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170187 45.742245 4977.590820 75.207802 66.184502 331.790051 45.886685 113.971428 27.231396 4.185295 331.779445 45.861905 105.864288 25.533970 4.146018 331.832361 45.937809 86.705360 21.740004 3.988286 331.798355 45.899440 111.580360 27.990971 3.986298 332.484944 45.635866 64.625000 16.871141 3.830505 331.807876 45.918940 91.864288 25.243319 3.639153 331.780003 45.849557 78.923218 23.544788 3.352046 331.816196 45.931037 74.144646 23.782518 3.117611 331.877370 45.853317 62.274509 20.491827 3.038993