Summary Page Created:Mon August 28, 2006 23:28 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290196

Instrument: HRC Obs ID: 2640 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02640N002 full img2.fits hrcf02640N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 23:28 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290196

Instrument: HRC Obs ID: 2640 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:07:02 Date and time of file creation DATE-OBS 2002-01-26T20:31:41 Observation start date DATE-END 2002-01-26T20:56:50 Observation end date RA PNT 332.20121863054 Pointing RA DEC PNT 45.697337549 Pointing Dec ROLL PNT 336.38879511796 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:26:18 Date and time of file creation DATE-OBS 2002-01-26T20:31:41 Observation start date DATE-END 2002-01-26T20:56:50 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2640 Observation id SEQ NUM 290196 Sequence number RA NOM 332.20121863054 Nominal RA DEC NOM 45.697337549 Nominal Dec ROLL NOM 336.38879511796 Nominal Roll

Summary Page Created:Mon August 28, 2006 23:28 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290196

Instrument: HRC Obs ID: 2640 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169870 45.742300 5164.666504 76.316383 67.674416 331.813106 45.837650 227.676788 34.667183 6.567502 331.778007 45.776240 129.843750 22.991346 5.647505 331.823944 45.862061 128.812500 24.472994 5.263455 331.804674 45.825610 184.254471 35.645538 5.169075 332.495423 45.557582 75.458336 19.005424 3.970358 331.795387 45.806521 119.143753 34.568066 3.446642 331.936560 45.758852 61.583332 18.422132 3.342899 331.798802 45.773229 88.791664 27.177801 3.267066 332.526004 45.605046 84.791664 26.085047 3.250585