Summary Page Created:Tue August 29, 2006 01:46 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290199

Instrument: HRC Obs ID: 2643 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02643N002 full img2.fits hrcf02643N002 cntr img2.fits

Summary Page Created:Tue August 29, 2006 01:46 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290199

Instrument: HRC Obs ID: 2643 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T05:08:13 Date and time of file creation DATE-OBS 2002-01-26T21:47:11 Observation start date DATE-END 2002-01-26T22:12:21 Observation end date RA PNT 331.97705650287 Pointing RA DEC PNT 45.838056156148 Pointing Dec ROLL PNT 336.68208879211 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T05:44:25 Date and time of file creation DATE-OBS 2002-01-26T21:47:11 Observation start date DATE-END 2002-01-26T22:12:21 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2643 Observation id SEQ NUM 290199 Sequence number RA NOM 331.97705650287 Nominal RA DEC NOM 45.838056156148 Nominal Dec ROLL NOM 336.68208879211 Nominal Roll

Summary Page Created:Tue August 29, 2006 01:46 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290199

Instrument: HRC Obs ID: 2643 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170374 45.742206 4641.476074 74.393265 62.391079 331.553481 45.921085 115.947319 25.859039 4.483822 331.589145 45.978917 136.150894 32.689091 4.165025 331.605358 45.997374 103.580360 27.840605 3.720478 331.569668 45.933971 115.091965 33.387539 3.447153 331.579089 45.959633 120.835716 35.308002 3.422332 332.195373 45.723851 46.791668 14.118814 3.314136 331.703891 45.979783 53.490196 16.298941 3.281820 332.185143 45.762328 40.002499 12.958080 3.087070 332.153116 45.737646 35.027500 11.655407 3.005258