Summary Page Created:Tue August 29, 2006 01:54 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290200

Instrument: HRC Obs ID: 2644 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02644N002 full img2.fits hrcf02644N002 cntr img2.fits

Summary Page Created:Tue August 29, 2006 01:54 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290200

Instrument: HRC Obs ID: 2644 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T05:21:49 Date and time of file creation DATE-OBS 2002-01-26T22:12:21 Observation start date DATE-END 2002-01-26T22:37:31 Observation end date RA PNT 332.41426177325 Pointing RA DEC PNT 45.704694971553 Pointing Dec ROLL PNT 336.24872081972 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T05:52:14 Date and time of file creation DATE-OBS 2002-01-26T22:12:21 Observation start date DATE-END 2002-01-26T22:37:31 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2644 Observation id SEQ NUM 290200 Sequence number RA NOM 332.41426177325 Nominal RA DEC NOM 45.704694971553 Nominal Dec ROLL NOM 336.24872081972 Nominal Roll

Summary Page Created:Tue August 29, 2006 01:54 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290200

Instrument: HRC Obs ID: 2644 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170115 45.742224 4242.724121 70.045097 60.571323 332.168510 45.741849 693.579529 64.927017 10.682449 332.026302 45.845311 114.999107 27.288284 4.214230 332.068568 45.867199 86.333336 20.852936 4.140105 332.017606 45.832991 110.971428 27.173471 4.083815 332.001055 45.806736 90.840179 23.682337 3.835778 332.255849 45.752168 27.318182 7.251486 3.767253 332.742778 45.630564 61.627453 18.273609 3.372484 332.737226 45.614253 63.568626 19.617390 3.240422 332.157590 45.733677 38.261364 11.934801 3.205865