Summary Page Created:Sat September 30, 2006 07:41 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290203

Instrument: HRC Obs ID: 2647 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02647N002 full img2.fits hrcf02647N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 07:41 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290203

Instrument: HRC Obs ID: 2647 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:23:28 Date and time of file creation DATE-OBS 2002-08-09T12:04:41 Observation start date DATE-END 2002-08-09T12:29:52 Observation end date RA PNT 332.30203797566 Pointing RA DEC PNT 45.719872141658 Pointing Dec ROLL PNT 165.68192415216 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:39:54 Date and time of file creation DATE-OBS 2002-08-09T12:04:41 Observation start date DATE-END 2002-08-09T12:29:52 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2647 Observation id SEQ NUM 290203 Sequence number RA NOM 332.30203797566 Nominal RA DEC NOM 45.719872141658 Nominal Dec ROLL NOM 165.68192415216 Nominal Roll

Summary Page Created:Sat September 30, 2006 07:41 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290203

Instrument: HRC Obs ID: 2647 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169927 45.742352 7155.886230 90.116188 79.407341 332.725751 45.686548 107.812500 24.015812 4.489230 332.724142 45.655538 106.753571 25.392912 4.204070 332.723596 45.642621 90.646431 23.374514 3.878003 332.706054 45.598846 70.570534 19.260157 3.664068 332.024979 45.743385 43.125000 13.274340 3.248749 332.624088 45.712096 43.400932 13.766432 3.152664 332.615698 45.606280 39.208332 12.925670 3.033370 331.972804 45.797323 50.921570 16.897272 3.013597