Summary Page Created:Sat September 30, 2006 07:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290204

Instrument: HRC Obs ID: 2648 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02648N002 full img2.fits hrcf02648N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 07:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290204

Instrument: HRC Obs ID: 2648 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:27:34 Date and time of file creation DATE-OBS 2002-08-09T12:29:52 Observation start date DATE-END 2002-08-09T12:55:01 Observation end date RA PNT 332.26845585727 Pointing RA DEC PNT 45.760314273678 Pointing Dec ROLL PNT 165.78132231151 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:45:06 Date and time of file creation DATE-OBS 2002-08-09T12:29:52 Observation start date DATE-END 2002-08-09T12:55:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2648 Observation id SEQ NUM 290204 Sequence number RA NOM 332.26845585727 Nominal RA DEC NOM 45.760314273678 Nominal Dec ROLL NOM 165.78132231151 Nominal Roll

Summary Page Created:Sat September 30, 2006 07:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290204

Instrument: HRC Obs ID: 2648 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170184 45.742284 5456.714355 78.844185 69.208832 332.170311 45.742271 4006.334961 78.326485 51.149174 332.672874 45.638660 83.933929 18.372755 4.568391 332.671731 45.734931 73.333336 19.127008 3.834020 332.701096 45.727959 65.736610 19.447100 3.380278 332.690686 45.689295 64.400894 20.646328 3.119242 332.636473 45.642810 56.375000 18.582771 3.033724