Summary Page Created:Sat September 30, 2006 08:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290205

Instrument: HRC Obs ID: 2649 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02649N002 full img2.fits hrcf02649N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 08:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290205

Instrument: HRC Obs ID: 2649 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:34:03 Date and time of file creation DATE-OBS 2002-08-09T12:55:01 Observation start date DATE-END 2002-08-09T13:20:12 Observation end date RA PNT 332.24481767107 Pointing RA DEC PNT 45.695522504339 Pointing Dec ROLL PNT 165.79825507626 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:37:15 Date and time of file creation DATE-OBS 2002-08-09T12:55:01 Observation start date DATE-END 2002-08-09T13:20:12 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2649 Observation id SEQ NUM 290205 Sequence number RA NOM 332.24481767107 Nominal RA DEC NOM 45.695522504339 Nominal Dec ROLL NOM 165.79825507626 Nominal Roll

Summary Page Created:Sat September 30, 2006 08:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290205

Instrument: HRC Obs ID: 2649 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169894 45.742285 5379.912598 78.205139 68.792313 332.169846 45.742314 5186.000000 79.393417 65.320282 332.645783 45.670820 70.041664 17.972849 3.897082 332.675560 45.644409 65.823212 17.599754 3.740007 332.666564 45.618105 63.740177 17.356323 3.672447 332.638169 45.673532 60.394405 16.606838 3.636719 332.675861 45.666996 56.241962 15.980642 3.519381 332.652218 45.571283 51.956810 15.634279 3.323262 331.887212 45.707732 45.875000 13.913081 3.297257 332.656054 45.585410 56.099998 17.891800 3.135515