Summary Page Created:Sat September 30, 2006 08:45 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290208

Instrument: HRC Obs ID: 2652 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02652N002 full img2.fits hrcf02652N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 08:45 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290208

Instrument: HRC Obs ID: 2652 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T11:42:55 Date and time of file creation DATE-OBS 2002-08-09T14:10:31 Observation start date DATE-END 2002-08-09T14:35:41 Observation end date RA PNT 332.11661417921 Pointing RA DEC PNT 45.751321003216 Pointing Dec ROLL PNT 166.80305354706 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:42:50 Date and time of file creation DATE-OBS 2002-08-09T14:10:31 Observation start date DATE-END 2002-08-09T14:35:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2652 Observation id SEQ NUM 290208 Sequence number RA NOM 332.11661417921 Nominal RA DEC NOM 45.751321003216 Nominal Dec ROLL NOM 166.80305354706 Nominal Roll

Summary Page Created:Sat September 30, 2006 08:45 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290208

Instrument: HRC Obs ID: 2652 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169991 45.742300 1111.571411 35.741009 31.100729 332.538623 45.680088 328.571442 47.986198 6.847207 332.537507 45.668006 245.340179 42.929634 5.714938 332.548193 45.718436 219.655350 40.297791 5.450804 332.518887 45.731340 168.875000 36.776478 4.591929 332.530101 45.655507 180.762497 40.781898 4.432420 331.771482 45.799258 130.833328 32.384201 4.040036 332.383202 45.653243 98.279068 26.908537 3.652338 331.776754 45.820746 104.125000 30.850195 3.375181 331.810893 45.845120 87.254906 26.471855 3.296139