Summary Page Created:Sat September 30, 2006 10:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290212

Instrument: HRC Obs ID: 2656 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02656N002 full img2.fits hrcf02656N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 10:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290212

Instrument: HRC Obs ID: 2656 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:51:55 Date and time of file creation DATE-OBS 2002-08-10T07:58:16 Observation start date DATE-END 2002-08-10T08:31:44 Observation end date RA PNT 332.08142656664 Pointing RA DEC PNT 45.791955116387 Pointing Dec ROLL PNT 166.96802697564 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T14:10:38 Date and time of file creation DATE-OBS 2002-08-10T07:58:16 Observation start date DATE-END 2002-08-10T08:31:44 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2656 Observation id SEQ NUM 290212 Sequence number RA NOM 332.08142656664 Nominal RA DEC NOM 45.791955116387 Nominal Dec ROLL NOM 166.96802697564 Nominal Roll

Summary Page Created:Sat September 30, 2006 10:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290212

Instrument: HRC Obs ID: 2656 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170202 45.742344 4282.916504 67.784798 63.184032 332.514599 45.764352 112.425003 23.517727 4.780437 332.503571 45.708103 125.691071 28.396574 4.426276 332.504837 45.720472 129.853577 29.922445 4.339671 332.513652 45.745964 90.362503 25.926207 3.485373 332.369940 45.696698 64.632317 19.085722 3.386422 331.742369 45.857296 64.208336 19.051622 3.370229 332.494601 45.676464 72.843750 21.636606 3.366690