Summary Page Created:Sat September 30, 2006 09:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290213

Instrument: HRC Obs ID: 2657 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02657N002 full img2.fits hrcf02657N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 09:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290213

Instrument: HRC Obs ID: 2657 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T12:51:28 Date and time of file creation DATE-OBS 2002-08-10T08:31:44 Observation start date DATE-END 2002-08-10T08:56:54 Observation end date RA PNT 332.40675420527 Pointing RA DEC PNT 45.737894141391 Pointing Dec ROLL PNT 166.39614007904 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:23:43 Date and time of file creation DATE-OBS 2002-08-10T08:31:44 Observation start date DATE-END 2002-08-10T08:56:54 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2657 Observation id SEQ NUM 290213 Sequence number RA NOM 332.40675420527 Nominal RA DEC NOM 45.737894141391 Nominal Dec ROLL NOM 166.39614007904 Nominal Roll

Summary Page Created:Sat September 30, 2006 09:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290213

Instrument: HRC Obs ID: 2657 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169779 45.741988 3994.013672 68.848587 58.011559 332.180735 45.768534 157.595001 20.129742 7.828963 332.186705 45.789363 114.695000 16.039309 7.150870 332.177402 45.762389 103.184998 18.901026 5.459228 332.174767 45.756411 89.312500 17.733730 5.036306 332.845471 45.709623 72.826782 15.547442 4.684165 332.173523 45.752457 67.567497 15.317913 4.411012 332.792936 45.616899 60.906250 17.626955 3.455290 332.073815 45.821055 44.916668 13.788979 3.257432 332.049405 45.746155 38.375000 12.510370 3.067455