Summary Page Created:Sat September 30, 2006 09:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290215

Instrument: HRC Obs ID: 2659 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02659N002 full img2.fits hrcf02659N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 09:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290215

Instrument: HRC Obs ID: 2659 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:07:36 Date and time of file creation DATE-OBS 2002-08-10T09:22:04 Observation start date DATE-END 2002-08-10T09:47:14 Observation end date RA PNT 332.20975478341 Pointing RA DEC PNT 45.736913535454 Pointing Dec ROLL PNT 166.76580448089 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:31:43 Date and time of file creation DATE-OBS 2002-08-10T09:22:04 Observation start date DATE-END 2002-08-10T09:47:14 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2659 Observation id SEQ NUM 290215 Sequence number RA NOM 332.20975478341 Nominal RA DEC NOM 45.736913535454 Nominal Dec ROLL NOM 166.76580448089 Nominal Roll

Summary Page Created:Sat September 30, 2006 09:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290215

Instrument: HRC Obs ID: 2659 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170097 45.742306 10553.659180 108.732330 97.060913 332.648617 45.708588 57.992859 15.436807 3.756791 332.640684 45.685393 64.930359 19.793734 3.280349 332.622641 45.633926 64.958038 19.846567 3.273011 332.489749 45.715841 31.250000 9.839965 3.175824 332.622156 45.621231 56.072323 17.832668 3.144360 332.637856 45.671965 57.321430 18.386671 3.117553