Summary Page Created:Sat September 30, 2006 09:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290216

Instrument: HRC Obs ID: 2660 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02660N002 full img2.fits hrcf02660N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 09:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290216

Instrument: HRC Obs ID: 2660 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:27:08 Date and time of file creation DATE-OBS 2002-08-10T09:47:14 Observation start date DATE-END 2002-08-10T10:12:24 Observation end date RA PNT 332.15307304723 Pointing RA DEC PNT 45.711916345996 Pointing Dec ROLL PNT 166.86656180191 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:48:49 Date and time of file creation DATE-OBS 2002-08-10T09:47:14 Observation start date DATE-END 2002-08-10T10:12:24 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2660 Observation id SEQ NUM 290216 Sequence number RA NOM 332.15307304723 Nominal RA DEC NOM 45.711916345996 Nominal Dec ROLL NOM 166.86656180191 Nominal Roll

Summary Page Created:Sat September 30, 2006 09:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290216

Instrument: HRC Obs ID: 2660 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169867 45.742355 11159.602539 112.519173 99.179558 332.573482 45.628431 117.947319 25.899712 4.554001 332.563814 45.596590 94.151787 20.963387 4.491249 332.585465 45.685123 86.341965 22.789003 3.788756 331.814392 45.781419 66.166664 19.166895 3.452133 331.801555 45.733594 58.791668 18.022274 3.262167 332.565710 45.615679 86.248215 27.067287 3.186437 332.584118 45.666010 78.864288 24.970112 3.158347 331.860361 45.792474 51.039867 16.523315 3.088960 331.825711 45.803610 54.791668 17.902201 3.060611