Summary Page Created:Sat September 30, 2006 10:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290221

Instrument: HRC Obs ID: 2665 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02665N002 full img2.fits hrcf02665N002 cntr img2.fits

Summary Page Created:Sat September 30, 2006 10:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290221

Instrument: HRC Obs ID: 2665 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T13:58:47 Date and time of file creation DATE-OBS 2002-08-10T11:53:05 Observation start date DATE-END 2002-08-10T12:18:14 Observation end date RA PNT 331.91987886565 Pointing RA DEC PNT 45.747670544071 Pointing Dec ROLL PNT 167.37268839429 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-09-30T14:21:08 Date and time of file creation DATE-OBS 2002-08-10T11:53:05 Observation start date DATE-END 2002-08-10T12:18:14 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2665 Observation id SEQ NUM 290221 Sequence number RA NOM 331.91987886565 Nominal RA DEC NOM 45.747670544071 Nominal Dec ROLL NOM 167.37268839429 Nominal Roll

Summary Page Created:Sat September 30, 2006 10:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290221

Instrument: HRC Obs ID: 2665 Source: ARLAC PI: Dr. CXC Calibration Title: AO3B HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169692 45.742318 6638.889648 89.304543 74.339882 332.262302 45.639234 67.212242 15.407149 4.362406 332.341801 45.663796 97.784821 23.751234 4.117042 332.343710 45.726228 86.400894 21.206593 4.074247 332.339527 45.651152 83.511604 21.327513 3.915675 331.629483 45.740698 40.107143 12.253634 3.273081 331.579374 45.792101 50.843136 16.772646 3.031313